η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Ratio

0.94

0.96

0.98 1 1.02

1.04

1.06

No fiducial cuts

η 2- 1.5- 1- 0.5- 0 0.5 1 1.5 2

Ratio

0.94

0.96

0.98 1 1.02

1.04

1.06

With fiducial cuts

= 7 TeV s ALICE INEL pp @

ITSTPC+ / Tracklet ITS+ / Tracklet